From 37a3f647569eb7f944a8ac65dc8763bbb877628d Mon Sep 17 00:00:00 2001
From: Jeffrey Schiller <jis@qyv.net>
Date: Tue, 17 Nov 2015 00:01:46 -0500
Subject: btrfs-progs: docs: fix typo in balance man page

Signed-off-by: David Sterba <dsterba@suse.com>
---
 Documentation/btrfs-balance.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'Documentation/btrfs-balance.asciidoc')

diff --git a/Documentation/btrfs-balance.asciidoc b/Documentation/btrfs-balance.asciidoc
index 7374a535..d00abdfc 100644
--- a/Documentation/btrfs-balance.asciidoc
+++ b/Documentation/btrfs-balance.asciidoc
@@ -134,7 +134,7 @@ vrange) or just simply limit the amount of work done by a single balance run.
 *soft*::
 Takes no parameters. Only has meaning when converting between profiles.
 When doing convert from one profile to another and soft mode is on,
-chunks that alread yave the target profile are left untouched
+chunks that already have the target profile are left untouched
  This is useful if e.g. half of the filesystem was converted earlier.
 +
 The soft mode switch is (like every other filter) per-type.
-- 
cgit v1.2.3

