From 93c3e27731321294a204c465f8b917946db38c85 Mon Sep 17 00:00:00 2001
From: John MacFarlane <jgm@berkeley.edu>
Date: Thu, 6 Jan 2011 21:05:28 -0800
Subject: pandoc:  Add newline to output unless standalone.

This avoids output that does not end with a newline, which
is inconvenient when working with many tools.

Updated tests accordingly.
---
 tests/tables.latex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'tests/tables.latex')

diff --git a/tests/tables.latex b/tests/tables.latex
index 5dac8e2a0..7f29b72c3 100644
--- a/tests/tables.latex
+++ b/tests/tables.latex
@@ -175,3 +175,4 @@ Second
 \\
 \end{tabular}
 \end{center}
+
-- 
cgit v1.2.3

