From feb70b6e93151682d0560ea30318d5c23ecae8e9 Mon Sep 17 00:00:00 2001
From: John MacFarlane <jgm@berkeley.edu>
Date: Tue, 20 Jul 2010 12:42:12 -0700
Subject: Made spacing at end of output more consistent.

Previously some of the writers added spurious whitespace.
This has been removed, resolving Issue #232.

NOTE: If your application combines pandoc's output with other
text, for example in a template, you may need to add spacing.
For example, a pandoc-generated markdown file will not have
a blank line after the final block element.  If you are inserting
it into another markdown file, you will need to make sure there
is a blank line between it and the next block element.
---
 tests/tables.latex | 1 -
 1 file changed, 1 deletion(-)

(limited to 'tests/tables.latex')

diff --git a/tests/tables.latex b/tests/tables.latex
index 7f29b72c3..5dac8e2a0 100644
--- a/tests/tables.latex
+++ b/tests/tables.latex
@@ -175,4 +175,3 @@ Second
 \\
 \end{tabular}
 \end{center}
-
-- 
cgit v1.2.3

